X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/0aa28e47e87fc78e152de7f1750e97ccf260c595..05e60b87508bd655b2fa1d183299f59161df1f08:/src/components/DetailsOneRow.svelte

diff --git a/src/components/DetailsOneRow.svelte b/src/components/DetailsOneRow.svelte
index ccc38cf..67c5152 100644
--- a/src/components/DetailsOneRow.svelte
+++ b/src/components/DetailsOneRow.svelte
@@ -38,8 +38,8 @@
 </tr>
 
 <style>
-  .notused {
-    color:#ddd;
+  .notused td {
+    color: #ccc;
   }
 
   td {
