X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/0aa28e47e87fc78e152de7f1750e97ccf260c595..93e26bcdb513375933713ad7fad61b30c14dc7ab:/src/components/Error.svelte?ds=sidebyside

diff --git a/src/components/Error.svelte b/src/components/Error.svelte
index e8702b9..fad20eb 100644
--- a/src/components/Error.svelte
+++ b/src/components/Error.svelte
@@ -14,6 +14,9 @@
   <div id="error" class="container-fluid alert-danger py-3 px-4">
     {error_message}
 
-    <button type="button" class="btn-close float-end" aria-label="dismiss" on:click={dismiss_message}></button>
+    <button type="button"
+            class="btn-close float-end"
+            aria-label="dismiss"
+            on:click={dismiss_message}></button>
   </div>
 {/if}
