X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/13812cb6b3f93966bffebfe118d2d7fa8623e137..2a34127a122a0d415a1cabb8de8e80a91b3dc017:/src/components/UrlSubmitForm.svelte

diff --git a/src/components/UrlSubmitForm.svelte b/src/components/UrlSubmitForm.svelte
index 2207361..01feea1 100644
--- a/src/components/UrlSubmitForm.svelte
+++ b/src/components/UrlSubmitForm.svelte
@@ -12,6 +12,9 @@
       if (['checkbox', 'radio'].indexOf(field.type) > -1 && !field.checked) return;
       if (typeof field.value === 'undefined' || field.value === '') return;
 
+      // Default value for /search endpoint
+      if (field.name === 'dedupe' && (field.value === 1 || field.value === '1')) return;
+
       params.set(field.name, field.value);
     });
 
@@ -46,5 +49,7 @@
 </script>
 
 <form on:submit|preventDefault={handle_submit} class="form-inline" role="search" accept-charset="UTF-8" action="">
-  <slot></slot>
+  <div class="row g-2">
+    <slot></slot>
+  </div>
 </form>
