X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/13812cb6b3f93966bffebfe118d2d7fa8623e137..a626c30095620f913366ef2c7db705f66ecdb988:/src/components/UrlSubmitForm.svelte

diff --git a/src/components/UrlSubmitForm.svelte b/src/components/UrlSubmitForm.svelte
index 2207361..a3dfaa0 100644
--- a/src/components/UrlSubmitForm.svelte
+++ b/src/components/UrlSubmitForm.svelte
@@ -46,5 +46,7 @@
 </script>
 
 <form on:submit|preventDefault={handle_submit} class="form-inline" role="search" accept-charset="UTF-8" action="">
-  <slot></slot>
+  <div class="row g-2">
+    <slot></slot>
+  </div>
 </form>
