X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/21bcfb32a13839ff8c69a452d09e294da800a15a..9c4975070c1d72fd10c1dec2038f840df0026b96:/src/components/PageLink.svelte

diff --git a/src/components/PageLink.svelte b/src/components/PageLink.svelte
index df124f7..0e2920a 100644
--- a/src/components/PageLink.svelte
+++ b/src/components/PageLink.svelte
@@ -16,4 +16,6 @@
   }
 </script>
 
-<a on:click|preventDefault|stopPropagation={handleClick} href={href} class={extra_classes}><slot></slot></a>
+<a on:click|preventDefault|stopPropagation={handleClick} href={href} class={extra_classes}>
+  <slot></slot>
+</a>
