X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/2ba00544d30017ad30570011b1a2bcc6a8da73a7..200f60bc3a38adc7ae5e9acbbbf0565b715bdb80:/src/components/DetailsPostcodeHint.svelte

diff --git a/src/components/DetailsPostcodeHint.svelte b/src/components/DetailsPostcodeHint.svelte
index 13ac99b..3397604 100644
--- a/src/components/DetailsPostcodeHint.svelte
+++ b/src/components/DetailsPostcodeHint.svelte
@@ -51,7 +51,7 @@
           class="btn-close float-end m-1"
           aria-label="Close"
           on:click|stopPropagation={closeHint}
-  />
+  ></button>
   <p>
     Nightly calculated from nearby places having this postcode.
     <a href="https://nominatim.org/release-docs/latest/admin/Maintenance/#updating-postcodes">
