X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/2f8b33afce5cd34432db91fbd4d6950bd38359a3..2a34127a122a0d415a1cabb8de8e80a91b3dc017:/src/components/SearchSectionReverse.svelte?ds=sidebyside

diff --git a/src/components/SearchSectionReverse.svelte b/src/components/SearchSectionReverse.svelte
index e8f1a47..2f53f39 100644
--- a/src/components/SearchSectionReverse.svelte
+++ b/src/components/SearchSectionReverse.svelte
@@ -29,7 +29,7 @@
 
   // common mistake is to copy&paste latitude and longitude into the 'lat' search box
   function maybeSplitLatitude(e) {
-    var coords_split = e.target.value.split(',');
+    var coords_split = e.target.value.split(/,|%2C/);
     if (coords_split.length === 2) {
       document.querySelector('input[name=lat]').value = L.Util.trim(coords_split[0]);
       document.querySelector('input[name=lon]').value = L.Util.trim(coords_split[1]);
