X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/349f05287a5b6fbb19f4c1638cc1d75ab258fb66..2ba00544d30017ad30570011b1a2bcc6a8da73a7:/src/components/ReverseLink.svelte

diff --git a/src/components/ReverseLink.svelte b/src/components/ReverseLink.svelte
index bbd54d7..cfea7c1 100644
--- a/src/components/ReverseLink.svelte
+++ b/src/components/ReverseLink.svelte
@@ -30,4 +30,8 @@ $: {
 }
 </script>
 
-<a on:click|preventDefault|stopPropagation={() => refresh_page('reverse', params)} href={href} class={extra_classes}><slot></slot></a>
+<a on:click|preventDefault|stopPropagation={() => refresh_page('reverse', params)}
+    href={href}
+    class={extra_classes}>
+  <slot></slot>
+</a>
