X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/349f05287a5b6fbb19f4c1638cc1d75ab258fb66..9106292ade3ec53e568287c5d72daa0ec7eb9e30:/src/components/DetailsOneRow.svelte

diff --git a/src/components/DetailsOneRow.svelte b/src/components/DetailsOneRow.svelte
index 7455245..4c43907 100644
--- a/src/components/DetailsOneRow.svelte
+++ b/src/components/DetailsOneRow.svelte
@@ -41,9 +41,6 @@
   .notused {
     color:#ddd;
   }
-  .noname{
-    color:#800;
-  }
 
   td {
     padding: 2px 8px;
