X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/3ef71c2a94b11b8c5728e8daed048b992b895a41..ff85679c2bc5fcc4119ab4da563fa5222440f3ab:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index 44738f2..129c893 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -11,6 +11,12 @@
   last_api_request_url_store.subscribe(url => {
     last_api_request_url = url;
 
+    if (last_api_request_url) {
+      last_api_request_url = new URL(last_api_request_url, window.location.origin);
+      last_api_request_url.searchParams.delete('polygon_geojson');
+      last_api_request_url = last_api_request_url.toString();
+    }
+
     if (fetch_running || last_updated_date) return;
 
     fetch_running = true;
