X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/42a0664654222836b24915e2bb484c5442daab06..6ab65d8875eeb387471c463ec3eb38cc3b6b2a07:/src/pages/SearchPage.svelte

diff --git a/src/pages/SearchPage.svelte b/src/pages/SearchPage.svelte
index 4ac637b..327d6aa 100644
--- a/src/pages/SearchPage.svelte
+++ b/src/pages/SearchPage.svelte
@@ -62,7 +62,7 @@
   onDestroy(() => { page_subscription(); });
 </script>
 
-<SearchBar reverse_search={false} api_request_params={api_request_params} bStructuredSearch={bStructuredSearch} />
+<SearchBar api_request_params={api_request_params} bStructuredSearch={bStructuredSearch} />
 
 <div id="content">
   <div class="sidebar">
