X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/45b0b24047c5ecf4d377dc194118017f79616941..c2a3d9e360d60b15cbf71840c2307fb3e0a3ea33:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index 129c893..0d7768d 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -48,7 +48,7 @@
 
 <div id="last-updated" class="container-fluid py-2 px-4 mb-3">
   <div id="loading" class="py-2 px-4">
-    <div class="spinner-border spinner-border-sm text-primary mr-1" role="status"></div>
+    <div class="spinner-border spinner-border-sm text-primary me-1" role="status"></div>
     Loading data from API ...
   </div>
   <div class="row">
@@ -62,10 +62,12 @@
         </div>
       {/if}
     </div>
-    <div class="col-sm-6 text-right">
+    <div class="col-sm-6 text-end">
       {#if last_updated_date}
         Data last updated:
-        <abbr id="data-date" title="{last_updated_date} (UTC timezone)">{timeago.format(new Date(last_updated_date))}</abbr>
+        <abbr id="data-date" title="{last_updated_date} (UTC timezone)">
+          {timeago.format(new Date(last_updated_date))}
+        </abbr>
       {/if}
       (<PageLink page="status">Details</PageLink>)
     </div>
