X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/528b7704bbb16007fe2bd09a505df52c23397452..7b4e51e7de73bdc35a101a181e28e4cb98c5f4fe:/src/components/DetailsLink.svelte

diff --git a/src/components/DetailsLink.svelte b/src/components/DetailsLink.svelte
index d914079..1785179 100644
--- a/src/components/DetailsLink.svelte
+++ b/src/components/DetailsLink.svelte
@@ -49,4 +49,6 @@
   }
 </script>
 
-<a on:click|preventDefault|stopPropagation={handleClick} href={href} class={extra_classes}><slot></slot></a>
+<a on:click|preventDefault|stopPropagation={handleClick} href={href} class={extra_classes}>
+  <slot></slot>
+</a>
