X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/52fe1d9f23298721943804931f2df9e42d1a09cc..ea40d1c5cf15d991bc3d2bc0a10a87f5505336f6:/src/pages/SearchPage.svelte

diff --git a/src/pages/SearchPage.svelte b/src/pages/SearchPage.svelte
index 24fe1d8..fd4e7c5 100644
--- a/src/pages/SearchPage.svelte
+++ b/src/pages/SearchPage.svelte
@@ -28,6 +28,7 @@
       dedupe: (!search_params.has('dedupe') || search_params.get('dedupe') === '1') ? 1 : 0,
       'accept-language': search_params.get('accept-language'),
       countrycodes: search_params.get('countrycodes'),
+      layer: search_params.get('layer'),
       limit: search_params.get('limit'),
       polygon_threshold: search_params.get('polygon_threshold'),
       exclude_place_ids: search_params.get('exclude_place_ids'),
