X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/62e52aea177da99ce119d9eaef86f5b153db86d6..76f9bc71cd1c7e0e292249e024f8f1be9633b274:/src/components/Map.svelte

diff --git a/src/components/Map.svelte b/src/components/Map.svelte
index 7b13187..bc2489f 100644
--- a/src/components/Map.svelte
+++ b/src/components/Map.svelte
@@ -186,7 +186,7 @@
 </script>
 
 <MapPosition />
-<div id="map" use:mapAction />
+<div id="map" use:mapAction></div>
 <button id="show-map-position" class="leaflet-bar btn btn-sm btn-outline-secondary"
       on:click|stopPropagation={show_map_position_click}
 >show map bounds</button>
