X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/64e1ec4d0f152bc9a279c2f016a111f9943dc6a4..1e4c08dcf8369732a0f3da72ed4ef1a99c9618dd:/src/components/SearchSection.svelte

diff --git a/src/components/SearchSection.svelte b/src/components/SearchSection.svelte
index e7520ad..e50bbdf 100644
--- a/src/components/SearchSection.svelte
+++ b/src/components/SearchSection.svelte
@@ -95,7 +95,8 @@
                type="text"
                class="form-control form-control-sm"
                placeholder="Search"
-               value="{api_request_params.q || ''}" />
+               value="{api_request_params.q || ''}"
+               autofocus />
       </div>
       <div class="col-auto">
         <button type="submit" class="btn btn-primary btn-sm mx-1">Search</button>
