X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/6ab65d8875eeb387471c463ec3eb38cc3b6b2a07..f51f2a70794858f9c8fb5d75ecd40fd1e4ec3897:/src/pages/SearchPage.svelte

diff --git a/src/pages/SearchPage.svelte b/src/pages/SearchPage.svelte
index 327d6aa..caa4e96 100644
--- a/src/pages/SearchPage.svelte
+++ b/src/pages/SearchPage.svelte
@@ -1,9 +1,7 @@
 <script>
   import { onMount, onDestroy } from 'svelte';
 
-  import {
-    page, results_store, current_request_latlon
-  } from '../lib/stores.js';
+  import { page, results_store } from '../lib/stores.js';
   import { get_config_value } from '../lib/config_reader.js';
   import { fetch_from_api, update_html_title } from '../lib/api_utils.js';
 
@@ -13,6 +11,7 @@
 
   let api_request_params;
   let bStructuredSearch;
+  let current_result;
 
   function loaddata() {
     let search_params = new URLSearchParams(window.location.search);
@@ -66,10 +65,10 @@
 
 <div id="content">
   <div class="sidebar">
-    <ResultsList reverse_search={false} />
+    <ResultsList bind:current_result reverse_search={false} />
   </div>
   <div id="map-wrapper">
-    <Map display_minimap={true} />
+    <Map {current_result} display_minimap={true} />
   </div>
 </div>
 
