X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/6e68f11776a8f6f5a62b989f13ebf7438ef32476..ecea2eedea2d87492f28ca713c2c1a4b7382256c:/src/components/Map.svelte?ds=sidebyside

diff --git a/src/components/Map.svelte b/src/components/Map.svelte
index b3b9e83..763495d 100644
--- a/src/components/Map.svelte
+++ b/src/components/Map.svelte
@@ -108,6 +108,7 @@
           clickable: false
         }
       );
+      cm.bindTooltip(`Search (${position_marker[0]},${position_marker[1]})`).openTooltip();
       cm.addTo(map);
       dataLayers.push(cm);
     }
@@ -136,6 +137,9 @@
       let circle = L.circleMarker([lat, lon], {
         radius: 10, weight: 2, fillColor: '#ff7800', color: 'blue', opacity: 0.75
       });
+      if (position_marker) { // reverse result
+        circle.bindTooltip('Result').openTooltip();
+      }
       map.addLayer(circle);
       dataLayers.push(circle);
     }
