X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/71b9066d9eed97aee7eff27a25d5c317b6f89595..455b3fd8634b07667051506a623e8fb7f309209a:/src/pages/AboutPage.svelte

diff --git a/src/pages/AboutPage.svelte b/src/pages/AboutPage.svelte
index e480730..6ce6a93 100644
--- a/src/pages/AboutPage.svelte
+++ b/src/pages/AboutPage.svelte
@@ -16,4 +16,4 @@
     max-width: 800px;
     padding: 4em;
   }
-</style>
\ No newline at end of file
+</style>
