X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/72012a070dc88cf6b6ce393a6698a3aa6df10a3c..be6a0daa34e44ab6ba65465769190a88b841e3d6:/src/pages/StatusPage.svelte?ds=sidebyside

diff --git a/src/pages/StatusPage.svelte b/src/pages/StatusPage.svelte
index c3bfb78..1a29d56 100644
--- a/src/pages/StatusPage.svelte
+++ b/src/pages/StatusPage.svelte
@@ -24,7 +24,11 @@
 
       <dl>
         <dt>API Endpoint</dt>
-        <dd><a href={configuration.Nominatim_API_Endpoint}>{configuration.Nominatim_API_Endpoint}</a></dd>
+        <dd>
+          <a href={configuration.Nominatim_API_Endpoint}>
+            {configuration.Nominatim_API_Endpoint}
+          </a>
+        </dd>
 
         <dt>Software version</dt>
         <dd>{aStatusData.software_version}</dd>
