X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/76e3136f32e35ded2caf989b0bf699de64798921..c636646759d9c541f7baf19812be18d002a8ce1d:/src/components/ResultsList.svelte

diff --git a/src/components/ResultsList.svelte b/src/components/ResultsList.svelte
index 584e481..cf931cb 100644
--- a/src/components/ResultsList.svelte
+++ b/src/components/ResultsList.svelte
@@ -5,7 +5,7 @@
   import Welcome from './Welcome.svelte';
   import MapIcon from './MapIcon.svelte';
 
-  export let reverse_search=false;
+  export let reverse_search = false;
 
   let aSearchResults;
   let iHighlightNum;
@@ -39,7 +39,7 @@
 
   function handleClick(e) {
     let result_el = e.target;
-    if (! result_el.className.match('result') ){
+    if (!result_el.className.match('result')) {
       result_el = result_el.parentElement;
     }
     let pos = Number(result_el.dataset.position);
