X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/76e3136f32e35ded2caf989b0bf699de64798921..c636646759d9c541f7baf19812be18d002a8ce1d:/src/pages/DeletablePage.svelte

diff --git a/src/pages/DeletablePage.svelte b/src/pages/DeletablePage.svelte
index 247c4c4..27e881a 100644
--- a/src/pages/DeletablePage.svelte
+++ b/src/pages/DeletablePage.svelte
@@ -6,7 +6,7 @@
   let aPolygons = [];
 
   function loaddata() {
-    fetch_from_api('deletable', {format: 'json'}, function(data){
+    fetch_from_api('deletable', { format: 'json' }, function (data) {
       aPolygons = data;
     });
     update_html_title('Deletable objects');
