X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/7ed97d6aceab15f29088f45aa6fbf1eda551173d..c296bef87014f72b3f8aae878b9a23f6c08780a7:/src/components/MapPosition.svelte?ds=sidebyside

diff --git a/src/components/MapPosition.svelte b/src/components/MapPosition.svelte
index 30d6bd9..074774d 100644
--- a/src/components/MapPosition.svelte
+++ b/src/components/MapPosition.svelte
@@ -115,9 +115,6 @@
     text-align: right;
   }
 
-  
-  
-
   @media (max-width: 768px) {
     #map-position {
       top: 20px;
