X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/82eae94284b6f0be5eeb1bc7e90350c4992994bf..143e72d53086da6ed825b4812dd27417b4394167:/src/components/LastUpdated.svelte?ds=sidebyside

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index a5b3277..129c893 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -9,11 +9,18 @@
   let fetch_running = false; // prevent multiple parallel fetch runs
 
   last_api_request_url_store.subscribe(url => {
+    last_api_request_url = url;
+
+    if (last_api_request_url) {
+      last_api_request_url = new URL(last_api_request_url, window.location.origin);
+      last_api_request_url.searchParams.delete('polygon_geojson');
+      last_api_request_url = last_api_request_url.toString();
+    }
+
     if (fetch_running || last_updated_date) return;
 
     fetch_running = true;
 
-    last_api_request_url = url;
     fetch_from_api('status', { format: 'json' }, function (data) {
       last_updated_date = data.data_updated;
       fetch_running = false;
