X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/838728183df7d6e4ae993faa950455cac4b42e9d..51dab2d73981ff460f7ddc4408df9767ce81ce7a:/src/components/SearchSection.svelte

diff --git a/src/components/SearchSection.svelte b/src/components/SearchSection.svelte
index a43ad75..efffc0f 100644
--- a/src/components/SearchSection.svelte
+++ b/src/components/SearchSection.svelte
@@ -99,8 +99,7 @@
                type="text"
                class="form-control form-control-sm"
                placeholder="Search"
-               value="{api_request_params.q || ''}"
-               autofocus />
+               value="{api_request_params.q || ''}" />
       </div>
       <div class="col-auto">
         <button type="submit" class="btn btn-primary btn-sm mx-1">Search</button>
