X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/895d4c51824f8e14b18dc11b2f12316a60a41646..7318ebd2ec5a7230e45ba97b024fe021baef1572:/src/App.svelte

diff --git a/src/App.svelte b/src/App.svelte
index 7188333..f295c69 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -5,8 +5,10 @@
 
   import Header from './components/Header.svelte';
   import Footer from './components/Footer.svelte';
+  import ReportIssueModal from './components/ReportIssueModal.svelte';
  </script>
 
 <Header/>
 <div id="main" />
 <Footer/>
+<ReportIssueModal/>
