X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/9ad36e2ce2a63535b7071acd26bc819d989b2f17..b7666a2992cefb982249a19c68467a14f36cc1bb:/src/components/DetailsOneRow.svelte

diff --git a/src/components/DetailsOneRow.svelte b/src/components/DetailsOneRow.svelte
index cbbad24..8b77df2 100644
--- a/src/components/DetailsOneRow.svelte
+++ b/src/components/DetailsOneRow.svelte
@@ -22,9 +22,11 @@
     {/if}
   </td>
   <td>{formatPlaceType(addressLine)}</td>
+  <!-- eslint-disable-next-line svelte/no-at-html-tags -->
   <td>{@html osmLink(addressLine)}</td>
   <td>{addressLine.rank_address}</td>
   <td>{formatAdminLevel(addressLine.admin_level)}</td>
+  <!-- eslint-disable-next-line svelte/no-at-html-tags -->
   <td>{@html formatDistance(addressLine.distance, bDistanceInMeters)}</td>
   <td>
     {#if addressLine.osm_id}
