X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/9e8d3367fe08a708b1019ff39ac752e0105be20a..05e60b87508bd655b2fa1d183299f59161df1f08:/src/pages/ReversePage.svelte?ds=inline

diff --git a/src/pages/ReversePage.svelte b/src/pages/ReversePage.svelte
index a990646..b43750f 100644
--- a/src/pages/ReversePage.svelte
+++ b/src/pages/ReversePage.svelte
@@ -1,9 +1,9 @@
 <script>
   import { page, results_store } from '../lib/stores.js';
-  import { get_config_value } from '../lib/config_reader.js';
   import { fetch_from_api, update_html_title } from '../lib/api_utils.js';
 
-  import ReverseBar from '../components/ReverseBar.svelte';
+  import Header from '../components/Header.svelte';
+  import SearchSectionReverse from '../components/SearchSectionReverse.svelte';
   import ResultsList from '../components/ResultsList.svelte';
   import Map from '../components/Map.svelte';
 
@@ -19,7 +19,7 @@
       lon: search_params.get('lon'),
       zoom: (search_params.get('zoom') > 1
         ? Number(search_params.get('zoom'))
-        : Number(get_config_value('Reverse_Default_Search_Zoom'))),
+        : Number(Nominatim_Config.Reverse_Default_Search_Zoom)),
       format: 'jsonv2'
     };
 
@@ -52,7 +52,9 @@
   }
 </script>
 
-<ReverseBar {...api_request_params} />
+<Header>
+  <SearchSectionReverse {...api_request_params} />
+</Header>
 
 <div id="content">
   <div class="sidebar">
@@ -67,19 +69,20 @@
 <style>
   .sidebar {
     width: 25%;
+    min-width: 200px;
     padding: 15px;
     padding-top: 0;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
   #map-wrapper {
     position: relative;
-    min-height: 300px;
     height: calc(100vh - 250pt);
+    min-height: 300px;
     width: 75%;
     padding-right: 20px;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
@@ -92,7 +95,9 @@
       width: 100%;
     }
     #map-wrapper {
+      width: 100%;
       height: 300px;
+      padding-left: 20px;
     }
   }
 </style>
