X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/9e8d3367fe08a708b1019ff39ac752e0105be20a..71b9066d9eed97aee7eff27a25d5c317b6f89595:/src/components/UrlSubmitForm.svelte

diff --git a/src/components/UrlSubmitForm.svelte b/src/components/UrlSubmitForm.svelte
index 72864b1..019fa8c 100644
--- a/src/components/UrlSubmitForm.svelte
+++ b/src/components/UrlSubmitForm.svelte
@@ -20,5 +20,5 @@
 </script>
 
 <form on:submit|preventDefault={(e) => refresh_page(page, serialize_form(e.target))} class="form-inline" role="search" accept-charset="UTF-8" action="">
-    <slot></slot>
+  <slot></slot>
 </form>
