X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/a4d91ff557a71d80f997b03b213acf1664e64ace..ff85679c2bc5fcc4119ab4da563fa5222440f3ab:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index f03e8cd..129c893 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -12,7 +12,7 @@
     last_api_request_url = url;
 
     if (last_api_request_url) {
-      last_api_request_url = new URL(last_api_request_url);
+      last_api_request_url = new URL(last_api_request_url, window.location.origin);
       last_api_request_url.searchParams.delete('polygon_geojson');
       last_api_request_url = last_api_request_url.toString();
     }
