X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/a5f594a93c83cfad8aa3361c422043a5e5db95c1..455b3fd8634b07667051506a623e8fb7f309209a:/src/components/MapPosition.svelte?ds=sidebyside

diff --git a/src/components/MapPosition.svelte b/src/components/MapPosition.svelte
index 30d6bd9..074774d 100644
--- a/src/components/MapPosition.svelte
+++ b/src/components/MapPosition.svelte
@@ -115,9 +115,6 @@
     text-align: right;
   }
 
-  
-  
-
   @media (max-width: 768px) {
     #map-position {
       top: 20px;
