X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/a626c30095620f913366ef2c7db705f66ecdb988..2ad2d560644dbaaf76d4bad21a59e87ce3eb842a:/src/components/SearchSectionReverse.svelte

diff --git a/src/components/SearchSectionReverse.svelte b/src/components/SearchSectionReverse.svelte
index a455a4e..46bb2b9 100644
--- a/src/components/SearchSectionReverse.svelte
+++ b/src/components/SearchSectionReverse.svelte
@@ -29,7 +29,7 @@
 
   // common mistake is to copy&paste latitude and longitude into the 'lat' search box
   function maybeSplitLatitude(e) {
-    var coords_split = e.target.value.split(',');
+    var coords_split = e.target.value.split(/,|%2C/);
     if (coords_split.length === 2) {
       document.querySelector('input[name=lat]').value = L.Util.trim(coords_split[0]);
       document.querySelector('input[name=lon]').value = L.Util.trim(coords_split[1]);
@@ -53,10 +53,10 @@
            on:change={maybeSplitLatitude} />
   </div>
   <div class="col-auto">
-    <a id="switch-coords"
+    <button id="switch-coords"
        on:click|preventDefault|stopPropagation={() => gotoCoordinates(lon, lat)}
        class="btn btn-outline-secondary btn-sm"
-       title="switch lat and lon">&lt;&gt;</a>
+       title="switch lat and lon">&lt;&gt;</button>
   </div>
   <div class="col-auto">
     <label for="reverse-lon">lon</label>
