X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/a626c30095620f913366ef2c7db705f66ecdb988..HEAD:/src/components/Error.svelte?ds=sidebyside

diff --git a/src/components/Error.svelte b/src/components/Error.svelte
index e8702b9..fad20eb 100644
--- a/src/components/Error.svelte
+++ b/src/components/Error.svelte
@@ -14,6 +14,9 @@
   <div id="error" class="container-fluid alert-danger py-3 px-4">
     {error_message}
 
-    <button type="button" class="btn-close float-end" aria-label="dismiss" on:click={dismiss_message}></button>
+    <button type="button"
+            class="btn-close float-end"
+            aria-label="dismiss"
+            on:click={dismiss_message}></button>
   </div>
 {/if}
