X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/b88128c55e585e8a1c33e3d1fe0093c5ba0a66d3..9eb0491f622ce7cf3cc804f63c25e70e951d152b:/src/pages/DetailsPage.svelte

diff --git a/src/pages/DetailsPage.svelte b/src/pages/DetailsPage.svelte
index 12d19d8..e5325e2 100644
--- a/src/pages/DetailsPage.svelte
+++ b/src/pages/DetailsPage.svelte
@@ -279,6 +279,7 @@
   }
 
   #map-wrapper {
+    position: relative;
     width:100%;
     min-height: auto;
     height:300px;
