X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/bdb214b388f5d9dae7f06c8205780284b7b20a11..1e4c08dcf8369732a0f3da72ed4ef1a99c9618dd:/src/components/Map.svelte

diff --git a/src/components/Map.svelte b/src/components/Map.svelte
index 1ef199c..dd2a1ae 100644
--- a/src/components/Map.svelte
+++ b/src/components/Map.svelte
@@ -28,7 +28,8 @@
       ],
       zoom: Nominatim_Config.Map_Default_Zoom
     });
-    if (typeof Nominatim_Config.Map_Default_Bounds !== 'undefined' && Nominatim_Config.Map_Default_Bounds) {
+    if (typeof Nominatim_Config.Map_Default_Bounds !== 'undefined'
+      && Nominatim_Config.Map_Default_Bounds) {
       map.fitBounds(Nominatim_Config.Map_Default_Bounds);
     }
 
