X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/be6a0daa34e44ab6ba65465769190a88b841e3d6..1e52708ba183a23280db004e28284a0ce6f1b5a8:/src/pages/DeletablePage.svelte

diff --git a/src/pages/DeletablePage.svelte b/src/pages/DeletablePage.svelte
index 0748b5c..82f0ee6 100644
--- a/src/pages/DeletablePage.svelte
+++ b/src/pages/DeletablePage.svelte
@@ -33,8 +33,7 @@
           <th>Place id</th>
           <th>Country Code</th>
           <th>Name</th>
-          <th>OSM id</th>
-          <th>OSM type</th>
+          <th>OSM object</th>
           <th>Class</th>
           <th>Type</th>
         </thead>
@@ -46,7 +45,6 @@
             <td>{polygon.name}</td>
             <!-- eslint-disable-next-line svelte/no-at-html-tags -->
             <td>{@html osmLink(polygon)}</td>
-            <td>{polygon.osm_type}</td>
             <td>{polygon.class}</td>
             <td>{polygon.type}</td>
           </tr>
