X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c061d3fd3d4c9135fdbda0af273d9fc0dc5b5535..1e4c08dcf8369732a0f3da72ed4ef1a99c9618dd:/src/pages/ReversePage.svelte

diff --git a/src/pages/ReversePage.svelte b/src/pages/ReversePage.svelte
index bdc7811..7d1fe60 100644
--- a/src/pages/ReversePage.svelte
+++ b/src/pages/ReversePage.svelte
@@ -1,6 +1,5 @@
 <script>
   import { page, results_store } from '../lib/stores.js';
-  import { get_config_value } from '../lib/config_reader.js';
   import { fetch_from_api, update_html_title } from '../lib/api_utils.js';
 
   import Header from '../components/Header.svelte';
@@ -20,15 +19,15 @@
       lon: search_params.get('lon'),
       zoom: (search_params.get('zoom') > 1
         ? Number(search_params.get('zoom'))
-        : Number(get_config_value('Reverse_Default_Search_Zoom'))),
+        : Number(Nominatim_Config.Reverse_Default_Search_Zoom)),
       format: 'jsonv2'
     };
 
     if (api_request_params.lat || api_request_params.lat) {
 
       fetch_from_api('reverse', api_request_params, function (data) {
+        position_marker = [api_request_params.lat, api_request_params.lon];
         if (data && !data.error) {
-          position_marker = [api_request_params.lat, api_request_params.lon];
           results_store.set([data]);
         } else {
           results_store.set([]);
@@ -70,19 +69,20 @@
 <style>
   .sidebar {
     width: 25%;
+    min-width: 200px;
     padding: 15px;
     padding-top: 0;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
   #map-wrapper {
     position: relative;
-    min-height: 300px;
     height: calc(100vh - 250pt);
+    min-height: 300px;
     width: 75%;
     padding-right: 20px;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
@@ -95,7 +95,9 @@
       width: 100%;
     }
     #map-wrapper {
+      width: 100%;
       height: 300px;
+      padding-left: 20px;
     }
   }
 </style>
