X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c296bef87014f72b3f8aae878b9a23f6c08780a7..daea333875ff6b51d99dea24997019e573e201c2:/src/components/Header.svelte

diff --git a/src/components/Header.svelte b/src/components/Header.svelte
index 97cbebd..0d678bd 100644
--- a/src/components/Header.svelte
+++ b/src/components/Header.svelte
@@ -17,8 +17,8 @@
     if (!map) return;
 
     map.on('move', function () {
-      map_lat = map.getCenter().lat;
-      map_lon = map.getCenter().lng;
+      map_lat = map.getCenter().lat.toFixed(5);
+      map_lon = map.getCenter().lng.toFixed(5);
     });
   });
 </script>
