X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c597ebf61d244dda966f8cc06799d897172fce84..f51f2a70794858f9c8fb5d75ecd40fd1e4ec3897:/src/App.svelte

diff --git a/src/App.svelte b/src/App.svelte
index 3e64b16..54cad5d 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -18,7 +18,7 @@
   refresh_page();
 </script>
 
-// deal with back-button and other user action
+<!-- deal with back-button and other user action -->
 <svelte:window on:popstate={refresh_page} />
 
 <Header/>
