X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c636646759d9c541f7baf19812be18d002a8ce1d..1df8bbfb327d8022a34cd2158853ad7e13d1a01e:/src/App.svelte?ds=sidebyside

diff --git a/src/App.svelte b/src/App.svelte
index c9443f3..54cad5d 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -8,6 +8,7 @@
   import Footer from './components/Footer.svelte';
   import ReportIssueModal from './components/ReportIssueModal.svelte';
   import SearchPage from './pages/SearchPage.svelte';
+  import ReversePage from './pages/ReversePage.svelte';
   import DetailsPage from './pages/DetailsPage.svelte';
   import PolygonsPage from './pages/PolygonsPage.svelte';
   import DeletablePage from './pages/DeletablePage.svelte';
@@ -17,11 +18,14 @@
   refresh_page();
 </script>
 
+<!-- deal with back-button and other user action -->
+<svelte:window on:popstate={refresh_page} />
+
 <Header/>
 {#if view === 'search'}
-<SearchPage reverse_search={false} />
+<SearchPage />
 {:else if view === 'reverse'}
-<SearchPage reverse_search={true}/>
+<ReversePage />
 {:else if view === 'details'}
 <DetailsPage />
 {:else if view === 'deletable'}
