X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c636646759d9c541f7baf19812be18d002a8ce1d..61e0c9318d8f48915877e6985a46f57ec6d43b83:/src/components/MapPosition.svelte

diff --git a/src/components/MapPosition.svelte b/src/components/MapPosition.svelte
index 650514d..5332185 100644
--- a/src/components/MapPosition.svelte
+++ b/src/components/MapPosition.svelte
@@ -53,7 +53,7 @@
 
 
   map_store.subscribe(map => {
-    if (!map) { return; }
+    if (!map) return;
 
     map.on('move', function () {
       display_map_position(map);
