X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c8f2b848e2f22878c79e03ee33cf29c9521ea65f..8258a52336c84b5bce8352334f5e356543df1b57:/src/pages/ReversePage.svelte

diff --git a/src/pages/ReversePage.svelte b/src/pages/ReversePage.svelte
index 7d1fe60..987f206 100644
--- a/src/pages/ReversePage.svelte
+++ b/src/pages/ReversePage.svelte
@@ -20,6 +20,7 @@
       zoom: (search_params.get('zoom') > 1
         ? Number(search_params.get('zoom'))
         : Number(Nominatim_Config.Reverse_Default_Search_Zoom)),
+      layer: search_params.get('layer'),
       format: 'jsonv2'
     };
 
@@ -53,7 +54,10 @@
 </script>
 
 <Header>
-  <SearchSectionReverse {...api_request_params} />
+  <SearchSectionReverse lat={api_request_params.lat}
+                        lon={api_request_params.lon}
+                        zoom={api_request_params.zoom}
+                        api_request_params={api_request_params} />
 </Header>
 
 <div id="content">
