X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/c9687b102bb6f544a034dc4d508bf0ae4a5fc221..7318ebd2ec5a7230e45ba97b024fe021baef1572:/src/App.svelte?ds=sidebyside

diff --git a/src/App.svelte b/src/App.svelte
index 839c135..f295c69 100644
--- a/src/App.svelte
+++ b/src/App.svelte
@@ -1,12 +1,14 @@
 <script>
   import * as jquery from 'jquery';
-  import '../node_modules/bootstrap/dist/css/bootstrap.css';
-  import '../node_modules/bootstrap/dist/js/bootstrap.bundle.js';
+  import 'bootstrap/dist/css/bootstrap.css';
+  import 'bootstrap/dist/js/bootstrap.bundle.js';
 
   import Header from './components/Header.svelte';
   import Footer from './components/Footer.svelte';
+  import ReportIssueModal from './components/ReportIssueModal.svelte';
  </script>
 
 <Header/>
 <div id="main" />
 <Footer/>
+<ReportIssueModal/>
