X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/cf65309ebbf892699701b8ed371adb8ade2c53cd..ecea2eedea2d87492f28ca713c2c1a4b7382256c:/src/pages/DetailsPage.svelte

diff --git a/src/pages/DetailsPage.svelte b/src/pages/DetailsPage.svelte
index 12d19d8..e5325e2 100644
--- a/src/pages/DetailsPage.svelte
+++ b/src/pages/DetailsPage.svelte
@@ -279,6 +279,7 @@
   }
 
   #map-wrapper {
+    position: relative;
     width:100%;
     min-height: auto;
     height:300px;
