X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/d66a65e04139037b0418b962e2b6ac1c9c032adf..f9ae81bddd61b9749df987e6c8ee9263ae464705:/src/components/Error.svelte?ds=sidebyside

diff --git a/src/components/Error.svelte b/src/components/Error.svelte
index db542e3..9267963 100644
--- a/src/components/Error.svelte
+++ b/src/components/Error.svelte
@@ -14,8 +14,6 @@
   <div id="error" class="container-fluid alert-danger py-3 px-4">
     {error_message}
 
-    <button type="button" class="close" aria-label="dismiss" on:click={dismiss_message}>
-      <span aria-hidden="true">&times;</span>
-    </button>
+    <button type="button" class="btn-close" aria-label="dismiss" on:click={dismiss_message}></button>
   </div>
 {/if}
