X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/d7a925a6567cd14b85e124354cabf62733e93f35..d7fc469d21068cd4812ede69677490c96292dd6d:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index 3f914ce..a51b4b6 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -1,4 +1,5 @@
 <script>
+  import PageLink from './PageLink.svelte';
   import * as timeago from 'timeago.js';
   import { last_api_request_url_store } from '../lib/stores.js';
   import { fetch_from_api } from '../lib/api_utils.js';
@@ -53,6 +54,7 @@
         Data last updated:
         <abbr id="data-date" title="{last_updated_date} (UTC timezone)">{timeago.format(new Date(last_updated_date))}</abbr>
       {/if}
+      (<PageLink page="status">Details</PageLink>)
     </div>
   </div>
 </div>
