X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/d7fc469d21068cd4812ede69677490c96292dd6d..ff85679c2bc5fcc4119ab4da563fa5222440f3ab:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index a51b4b6..129c893 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -6,11 +6,24 @@
 
   let last_updated_date;
   let last_api_request_url;
+  let fetch_running = false; // prevent multiple parallel fetch runs
 
   last_api_request_url_store.subscribe(url => {
     last_api_request_url = url;
+
+    if (last_api_request_url) {
+      last_api_request_url = new URL(last_api_request_url, window.location.origin);
+      last_api_request_url.searchParams.delete('polygon_geojson');
+      last_api_request_url = last_api_request_url.toString();
+    }
+
+    if (fetch_running || last_updated_date) return;
+
+    fetch_running = true;
+
     fetch_from_api('status', { format: 'json' }, function (data) {
       last_updated_date = data.data_updated;
+      fetch_running = false;
     });
   });
 </script>
