X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/dcd59f06164a299845230ad55c231e6a2fcd338e..0ba857ac4c4edb839832b63010ca8550da701da5:/src/pages/ReversePage.svelte

diff --git a/src/pages/ReversePage.svelte b/src/pages/ReversePage.svelte
index bdc7811..9f3bacb 100644
--- a/src/pages/ReversePage.svelte
+++ b/src/pages/ReversePage.svelte
@@ -70,19 +70,20 @@
 <style>
   .sidebar {
     width: 25%;
+    min-width: 200px;
     padding: 15px;
     padding-top: 0;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
   #map-wrapper {
     position: relative;
-    min-height: 300px;
     height: calc(100vh - 250pt);
+    min-height: 300px;
     width: 75%;
     padding-right: 20px;
-    display: inline-block;
+    display: block;
     float: left;
   }
 
@@ -95,7 +96,9 @@
       width: 100%;
     }
     #map-wrapper {
+      width: 100%;
       height: 300px;
+      padding-left: 20px;
     }
   }
 </style>
