X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/e678691b909996b245bdd17e7345467634703d6b..143e72d53086da6ed825b4812dd27417b4394167:/src/components/DetailsOneRow.svelte?ds=sidebyside

diff --git a/src/components/DetailsOneRow.svelte b/src/components/DetailsOneRow.svelte
index 7455245..4c43907 100644
--- a/src/components/DetailsOneRow.svelte
+++ b/src/components/DetailsOneRow.svelte
@@ -41,9 +41,6 @@
   .notused {
     color:#ddd;
   }
-  .noname{
-    color:#800;
-  }
 
   td {
     padding: 2px 8px;
