X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f2633dcc2939466943d2257439c12775fb712a11..0aa28e47e87fc78e152de7f1750e97ccf260c595:/src/components/DetailsInfoRowList.svelte

diff --git a/src/components/DetailsInfoRowList.svelte b/src/components/DetailsInfoRowList.svelte
index 7fcba67..637159b 100644
--- a/src/components/DetailsInfoRowList.svelte
+++ b/src/components/DetailsInfoRowList.svelte
@@ -3,8 +3,9 @@
 </script>
 
 <style>
-  .name{
+  .name {
     font-weight: bold;
+    overflow-wrap: anywhere;
   }
 </style>
 
